%
% 
%
% Copyright (C) 1997-2011 by Dimitri van Heesch.
%
% Permission to use, copy, modify, and distribute this software and its
% documentation under the terms of the GNU General Public License is hereby 
% granted. No representations are made about the suitability of this software 
% for any purpose. It is provided "as is" without express or implied warranty.
% See the GNU General Public License for more details.
%
% Documents produced by Doxygen are derivative works derived from the
% input used in their production; they are not affected by this license.

\documentclass[a4paper]{report}
\usepackage{a4wide}
\usepackage{makeidx}
\usepackage{fancyhdr}
\usepackage{float}
\usepackage{longtable}
\usepackage{graphicx}
\usepackage{epsf}
\usepackage{doxygen}
\usepackage{multicol}
\usepackage{times}
\usepackage{alltt}
\usepackage{tocloft}
\usepackage[pdftex,
            pagebackref=true,
            colorlinks=true,
            linkcolor=blue
           ]{hyperref}
\makeindex
\setcounter{tocdepth}{1}
\renewcommand{\footrulewidth}{0.4pt}
\renewcommand{\cftsecindent}{0 em}
\renewcommand{\cftsecnumwidth}{3.2 em}
\renewcommand{\cftsubsecindent}{3.2 em}
\newcommand{\thisyear}{\the\year}
\begin{document}
\begin{titlepage}
\includegraphics[width=\textwidth]{doxygen_logo}
\begin{center}
Manual for version $VERSION\\[2ex]
Written by Dimitri van Heesch\\[2ex]
\copyright 1997-\thisyear
\end{center}
\end{titlepage}
\clearemptydoublepage
\tableofcontents
\clearemptydoublepage
\pagenumbering{arabic}
\include{index}
\part{User Manual}
\chapter{Installation}\label{install}\hypertarget{install}{}\input{install}
\chapter{Getting Started}\label{starting}\hypertarget{starting}{}\input{starting}
\chapter{Documenting the code}\label{docblocks}\hypertarget{docblocks}{}\input{docblocks}
\chapter{Lists}\label{lists}\hypertarget{lists}{}\input{lists}
\chapter{Grouping}\label{grouping}\hypertarget{grouping}{}\input{grouping}
\chapter{Including Formulas}\label{formulas}\hypertarget{formulas}{}\input{formulas}
\chapter{Graphs and diagrams}\label{diagrams}\hypertarget{diagrams}{}\input{diagrams}
\chapter{Preprocessing}\label{preprocessing}\hypertarget{preprocessing}{}\input{preprocessing}
\chapter{Automatic link generation}\label{autolink}\hypertarget{autolink}{}\input{autolink}
\chapter{Output Formats}\label{output}\hypertarget{output}{}\input{output}
\chapter{Searching}\label{searching}\hypertarget{searching}{}\input{searching}
\chapter{Customizing the Output}\label{customize}\hypertarget{customize}{}\input{customize}
\chapter{Custom Commands}\label{custcmd}\hypertarget{custcmd}{}\input{custcmd}
\chapter{Link to external documentation}\label{external}\hypertarget{external}{}\input{external}
\chapter{Frequently Asked Questions}\label{faq}\hypertarget{faq}{}\input{faq}
\chapter{Troubleshooting}\label{trouble}\hypertarget{trouble}{}\input{trouble}
\part{Reference Manual}
\chapter{Features}\label{features}\hypertarget{features}{}\input{features}
\chapter{Doxygen usage}\label{doxygen_usage}\hypertarget{doxygen_usage}{}\input{doxygen_usage}
\chapter{Doxytag usage}\label{doxytag_usage}\hypertarget{doxytag_usage}{}\input{doxytag_usage}
\chapter{Doxywizard usage}\label{doxywizard_usage}\hypertarget{doxywizard_usage}{}\input{doxywizard_usage}
\chapter{Installdox usage}\label{installdox_usage}\hypertarget{installdox_usage}{}\input{installdox_usage}
\chapter{Configuration}\label{config}\hypertarget{config}{}\input{config}
\chapter{Special Commands}\label{commands}\hypertarget{commands}{}\input{commands}
\chapter{HTML commands}\label{htmlcmds}\hypertarget{htmlcmds}{}\input{htmlcmds}
\chapter{XML commands}\label{xmlcmds}\hypertarget{xmlcmds}{}\input{xmlcmds}
\part{Developers Manual}
\chapter{Doxygen's internals}\label{arch}\hypertarget{arch}{}\input{arch}
\chapter{Perl Module Output format}\label{perlmod}\hypertarget{perlmod}{}\input{perlmod}
\chapter{Internationalization}\label{langhowto}\hypertarget{langhowto}{}\input{langhowto}
\printindex
\end{document}
